100 200 300

-0.2 0 0.2 0.4 0.6 0.8 1 1.2 1.4

IO WP RS A & B WS a

Longitude (E)

100 200 300 -3 -2 -1 0 1 2 3

IO WP RS A & B WS

Radian

Longitude (E) b

80 85 90 95 0

0.5

1

1.5

2

2.5 c

Year

Degree of longitude

80 85 90 95 -3 -2 -1 0 1 2 3 d

Year

10^{-1} 10^0 10^1 10^2

10^{-4}

10^{-2}

10^0

10^2 e

Year degree 2/cpm